0 1 2 3 4 5 6 7 8 9 10

0.88

0.9

0.92

0.94

0.96

0.98

1

Percentage of Training Images with Labels Negated

Average Classification Accuracy with 95% Confidence Interval

DD-SVM MI-SVM