1 2 3 4 5 6 7 8 9 10 x 10^{-3}

0.845

0.85

0.855

0.86

0.865

0.87

s

Classification Accuracy (MUSK1)

1 2 3 4 5 6 7 8 9 10 x 10^{-3} 0.9 0.905

0.91

0.915

0.92

0.925

s

Classification Accuracy (MUSK2)