\begin{table}[H]
\begin{picture}(400,350)
\put(-12,170){
\begin{minipage}{5in}
{\tiny \addtolength{\columnsep}{10mm}
\begin{tabular}{|r|r||r|r|r||r|r|r||r|r|r||r|r|r|}\hline\hline
\multicolumn{2}{|c||}{$N_D\rightarrow$} & \multicolumn{3}{c||}{50}
& \multicolumn{3}{c||}{100} & \multicolumn{3}{c||}{200} &
\multicolumn{3}{c|}{400}\\\hline
{}  $   N   $   &   $   K   $   &   $   \delta\ (\%)          $   &   $   Q_l $   &   $   Q_u     $   &   $   \delta\ (\%)          $   &   $   Q_l $   &   $   Q_u     $   &   $   \delta\ (\%)         $   &   $   Q_l $   &   $   Q_u     $   &   $   \delta\ (\%)        $   &   $    Q_l    $   &   $   Q_u $\\\hline
\rowcolor[gray]{.8}
{}  $   10  $   &   $   5   $   &   $   17.2    \pm 1.6 $   &   $   8.4 $   &   $   24.0    $   &   $   17.0    \pm 1.4 $   &   $   9.5 $   &   $   22.8    $   &   $   16.5    \pm 1.4 $   &   $   8.7 $   &   $   21.7    $   &   $   14.0    \pm 1.2 $   &   $   7.3 $   &   $   19.4    $   \\\hline
\rowcolor[gray]{.8}
{}  $   10  $   &   $   10  $   &   $   17.1    \pm 1.6 $   &   $   7.7 $   &   $   23.6    $   &   $   16.9    \pm 1.4 $   &   $   9.2 $   &   $   23.9    $   &   $   16.2    \pm 1.4 $   &   $   7.9 $   &   $   23.5    $   &   $   15.5    \pm 1.3 $   &   $   7.8 $   &   $   21.2    $   \\\hline
{}  $   20  $   &   $   5   $   &   $   8.7 \pm 1.1 $   &   $   3.1 $   &   $   12.1    $   &   $   8.7 \pm 1.0 $   &   $   3.7 $   &   $   12.2    $   &   $   8.4 \pm 0.9 $   &   $   4.1 $   &   $   11.3    $   &   $   9.0 \pm 1.0 $   &   $   3.9 $   &   $   13.3    $   \\\hline
{}  $   20  $   &   $   10  $   &   $   8.1 \pm 1.0 $   &   $   3.2 $   &   $   12.4    $   &   $   10.0    \pm 1.3 $   &   $   3.5 $   &   $   13.5    $   &   $   9.6 \pm 1.0 $   &   $   4.7 $   &   $   12.5    $   &   $   8.9 \pm 1.1 $   &   $   3.3 $   &   $   11.9    $   \\\hline
{}  $   20  $   &   $   20  $   &   $   8.5 \pm 1.0 $   &   $   3.7 $   &   $   11.9    $   &   $   9.6 \pm 1.1 $   &   $   3.8 $   &   $   13.9    $   &   $   10.1    \pm 1.1 $   &   $   4.4 $   &   $   13.7    $   &   $   9.8 \pm 1.1 $   &   $   4.2 $   &   $   13.4    $   \\\hline
\rowcolor[gray]{.8}
{}  $   40  $   &   $   5   $   &   $   3.8 \pm 0.8 $   &   $   0.3 $   &   $   7.3 $   &   $   3.5 \pm 0.6 $   &   $   0.8 $   &   $   6.2 $   &   $   4.5 \pm 0.6 $   &   $   1.7 $   &   $   6.9 $   &   $   4.6 \pm 0.6 $   &   $   1.5 $   &   $   5.7 $   \\\hline
\rowcolor[gray]{.8}
{}  $   40  $   &   $   10  $   &   $   3.0 \pm 0.6 $   &   $   0.2 $   &   $   5.5 $   &   $   4.2 \pm 0.6 $   &   $   1.3 $   &   $   6.6 $   &   $   3.8 \pm 0.6 $   &   $   0.8 $   &   $   5.7 $   &   $   4.6 \pm 0.7 $   &   $   1.5 $   &   $   6.2 $   \\\hline
\rowcolor[gray]{.8}
{}  $   40  $   &   $   20  $   &   $   3.0 \pm 0.6 $   &   $   0.2 $   &   $   4.8 $   &   $   4.6 \pm 0.7 $   &   $   1.5 $   &   $   6.9 $   &   $   4.4 \pm 0.9 $   &   $   1.1 $   &   $   6.7 $   &   $   6.1 \pm 1.0 $   &   $   2.1 $   &   $   7.9 $   \\\hline
\rowcolor[gray]{.8}
{}  $   40  $   &   $   40  $   &   $   2.2 \pm 0.5 $   &   $   -0.2    $   &   $   4.2 $   &   $   3.5 \pm 0.7 $   &   $   0.6 $   &   $   5.7 $   &   $   4.6 \pm 0.7 $   &   $   1.4 $   &   $   6.8 $   &   $   5.9 \pm 0.8 $   &   $   2.0 $   &   $   8.1 $   \\\hline
{}  $   80  $   &   $   5   $   &   $   2.8 \pm 0.7 $   &   $   -0.4    $   &   $   4.9 $   &   $   2.7 \pm 0.6 $   &   $   -0.2    $   &   $   5.0 $   &   $   2.4 \pm 0.5 $   &   $   0.1 $   &   $   4.3 $   &   $   2.1 \pm 0.4 $   &   $   0.3 $   &   $   3.8 $   \\\hline
{}  $   80  $   &   $   10  $   &   $   1.6 \pm 0.5 $   &   $   -0.6    $   &   $   2.9 $   &   $   1.5 \pm 0.5 $   &   $   -0.8    $   &   $   3.7 $   &   $   2.1 \pm 0.4 $   &   $   0.0 $   &   $   3.7 $   &   $   2.6 \pm 0.4 $   &   $   0.6 $   &   $   4.4 $   \\\hline
{}  $   80  $   &   $   20  $   &   $   1.2 \pm 0.5 $   &   $   -0.7    $   &   $   2.6 $   &   $   1.3 \pm 0.5 $   &   $   -0.7    $   &   $   2.9 $   &   $   1.9 \pm 0.4 $   &   $   -0.1    $   &   $   3.6 $   &   $   2.4 \pm 0.5 $   &   $   0.2 $   &   $   4.0 $   \\\hline
{}  $   80  $   &   $   40  $   &   $   0.7 \pm 0.5 $   &   $   -1.1    $   &   $   2.1 $   &   $   1.0 \pm 0.4 $   &   $   -1.1    $   &   $   2.8 $   &   $   1.4 \pm 0.5 $   &   $   -0.5    $   &   $   3.1 $   &   $   2.3 \pm 0.5 $   &   $   0.1 $   &   $   3.9 $   \\\hline
{}  $   80  $   &   $   80  $   &   $   0.7 \pm 0.5 $   &   $   -1.0    $   &   $   1.9 $   &   $   1.0 \pm 0.4 $   &   $   -0.8    $   &   $   2.6 $   &   $   1.8 \pm 0.4 $   &   $   -0.1    $   &   $   3.1 $   &   $   2.4 \pm 0.5 $   &   $   0.1 $   &   $   4.4 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   5   $   &   $   2.0 \pm 0.6 $   &   $   -0.9    $   &   $   3.6 $   &   $   2.2 \pm 0.6 $   &   $   -0.9    $   &   $   4.5 $   &   $   2.2 \pm 0.5 $   &   $   -0.1    $   &   $   4.1 $   &   $   1.6 \pm 0.4 $   &   $   -0.3    $   &   $   3.2 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   10  $   &   $   1.2 \pm 0.5 $   &   $   -1.0    $   &   $   2.8 $   &   $   1.8 \pm 0.5 $   &   $   -0.5    $   &   $   3.8 $   &   $   1.6 \pm 0.4 $   &   $   -0.6    $   &   $   3.8 $   &   $   1.2 \pm 0.4 $   &   $   -0.6    $   &   $   2.9 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   20  $   &   $   1.1 \pm 0.5 $   &   $   -0.5    $   &   $   2.2 $   &   $   0.9 \pm 0.4 $   &   $   -1.0    $   &   $   2.6 $   &   $   1.0 \pm 0.4 $   &   $   -0.7    $   &   $   2.9 $   &   $   0.9 \pm 0.4 $   &   $   -1.0    $   &   $   2.6 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   40  $   &   $   0.6 \pm 0.4 $   &   $   -1.0    $   &   $   1.7 $   &   $   0.5 \pm 0.4 $   &   $   -1.3    $   &   $   2.0 $   &   $   0.5 \pm 0.4 $   &   $   -1.0    $   &   $   1.9 $   &   $   0.8 \pm 0.4 $   &   $   -1.1    $   &   $   2.4 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   80  $   &   $   0.6 \pm 0.4 $   &   $   -1.1    $   &   $   1.6 $   &   $   0.5 \pm 0.4 $   &   $   -1.3    $   &   $   2.0 $   &   $   0.5 \pm 0.3 $   &   $   -1.2    $   &   $   1.9 $   &   $   0.7 \pm 0.4 $   &   $   -1.1    $   &   $   2.4 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   160 $   &   $   0.1 \pm 0.3 $   &   $   -1.4    $   &   $   1.5 $   &   $   0.7 \pm 0.4 $   &   $   -1.1    $   &   $   2.0 $   &   $   0.7 \pm 0.3 $   &   $   -0.9    $   &   $   2.3 $   &   $   0.5 \pm 0.4 $   &   $   -1.2    $   &   $   2.1 $   \\\hline
\hline \multicolumn{2}{|c||}{$N_D\rightarrow$} &
\multicolumn{3}{c||}{800}                        &
\multicolumn{3}{c||}{1600}                                       &
\multicolumn{3}{c||}{3200}                                       &
\multicolumn{3}{c|}{6400}\\\hline
{}  $   N   $   &   $   K   $   &   $   \delta\ (\%)          $   &   $   Q_l $   &   $   Q_u     $   &   $   \delta\ (\%)          $   &   $   Q_l $   &   $   Q_u     $   &   $   \delta\ (\%)         $   &   $   Q_l $   &   $   Q_u     $   &   $   \delta\ (\%)        $   &   $    Q_l    $   &   $   Q_u $\\\hline
\rowcolor[gray]{.8}
{}  $   10  $   &   $   5   $   &   $   13.8    \pm 1.3 $   &   $   6.7 $   &   $   19.2    $   &   $   11.5    \pm 1.0 $   &   $   5.2 $   &   $   15.8    $   &   $   11.5    \pm 1.2 $   &   $   4.3 $   &   $   17.1    $   &   $   10.0    \pm 1.3 $   &   $   2.9 $   &   $   14.5    $   \\\hline
\rowcolor[gray]{.8}
{}  $   10  $   &   $   10  $   &   $   12.3    \pm 1.2 $   &   $   5.5 $   &   $   18.1    $   &   $   10.5    \pm 1.2 $   &   $   3.9 $   &   $   14.3    $   &   $   8.4 \pm 1.1 $   &   $   2.9 $   &   $   11.3    $   &   $   8.4 \pm 1.1 $   &   $   2.4 $   &   $   11.9    $   \\\hline
{}  $   20  $   &   $   5   $   &   $   7.7 \pm 0.9 $   &   $   2.6 $   &   $   11.7    $   &   $   7.7 \pm 1.0 $   &   $   1.8 $   &   $   11.8    $   &   $   5.9 \pm 0.9 $   &   $   1.2 $   &   $   8.2 $   &   $   5.7 \pm 1.0 $   &   $   0.9 $   &   $   7.8 $   \\\hline
{}  $   20  $   &   $   10  $   &   $   8.2 \pm 1.0 $   &   $   2.8 $   &   $   12.6    $   &   $   6.0 \pm 0.9 $   &   $   1.6 $   &   $   8.5 $   &   $   3.4 \pm 0.7 $   &   $   0.7 $   &   $   4.0 $   &   $   3.1 \pm 0.6 $   &   $   0.4 $   &   $   3.7 $   \\\hline
{}  $   20  $   &   $   20  $   &   $   8.7 \pm 1.1 $   &   $   2.8 $   &   $   12.6    $   &   $   7.4 \pm 1.0 $   &   $   2.0 $   &   $   11.2    $   &   $   5.8 \pm 0.9 $   &   $   1.1 $   &   $   7.5 $   &   $   5.0 \pm 0.9 $   &   $   0.6 $   &   $   6.7 $   \\\hline
\rowcolor[gray]{.8}
{}  $   40  $   &   $   5   $   &   $   4.6 \pm 0.7 $   &   $   1.3 $   &   $   6.3 $   &   $   3.1 \pm 0.6 $   &   $   0.7 $   &   $   3.9 $   &   $   3.7 \pm 0.7 $   &   $   0.5 $   &   $   4.3 $   &   $   3.4 \pm 0.8 $   &   $   0.2 $   &   $   3.6 $   \\\hline
\rowcolor[gray]{.8}
{}  $   40  $   &   $   10  $   &   $   4.8 \pm 0.7 $   &   $   1.6 $   &   $   6.5 $   &   $   3.5 \pm 0.6 $   &   $   1.0 $   &   $   4.4 $   &   $   3.1 \pm 0.7 $   &   $   0.5 $   &   $   3.3 $   &   $   2.3 \pm 0.6 $   &   $   0.2 $   &   $   2.2 $   \\\hline
\rowcolor[gray]{.8}
{}  $   40  $   &   $   20  $   &   $   6.0 \pm 0.8 $   &   $   1.8 $   &   $   8.2 $   &   $   6.1 \pm 0.9 $   &   $   1.6 $   &   $   8.8 $   &   $   5.4 \pm 0.9 $   &   $   0.8 $   &   $   8.0 $   &   $   5.0 \pm 1.0 $   &   $   0.5 $   &   $   7.7 $   \\\hline
\rowcolor[gray]{.8}
{}  $   40  $   &   $   40  $   &   $   7.5 \pm 1.0 $   &   $   2.7 $   &   $   10.0    $   &   $   6.6 \pm 1.0 $   &   $   1.7 $   &   $   10.0    $   &   $   7.3 \pm 1.0 $   &   $   1.1 $   &   $   11.0    $   &   $   5.9 \pm 1.0 $   &   $   0.6 $   &   $   9.6 $   \\\hline
{}  $   80  $   &   $   5   $   &   $   2.3 \pm 0.4 $   &   $   0.5 $   &   $   3.4 $   &   $   2.0 \pm 0.5 $   &   $   0.3 $   &   $   2.7 $   &   $   2.2 \pm 0.5 $   &   $   0.2 $   &   $   2.7 $   &   $   1.8 \pm 0.5 $   &   $   0.1 $   &   $   1.8 $   \\\hline
{}  $   80  $   &   $   10  $   &   $   2.3 \pm 0.4 $   &   $   0.6 $   &   $   3.6 $   &   $   2.3 \pm 0.4 $   &   $   0.5 $   &   $   3.2 $   &   $   1.9 \pm 0.4 $   &   $   0.4 $   &   $   2.4 $   &   $   1.3 \pm 0.3 $   &   $   0.1 $   &   $   1.4 $   \\\hline
{}  $   80  $   &   $   20  $   &   $   2.7 \pm 0.5 $   &   $   0.7 $   &   $   4.5 $   &   $   3.0 \pm 0.5 $   &   $   0.8 $   &   $   4.4 $   &   $   3.9 \pm 0.6 $   &   $   0.8 $   &   $   5.1 $   &   $   3.6 \pm 0.6 $   &   $   0.6 $   &   $   5.1 $   \\\hline
{}  $   80  $   &   $   40  $   &   $   2.9 \pm 0.5 $   &   $   0.6 $   &   $   4.4 $   &   $   3.9 \pm 0.6 $   &   $   0.9 $   &   $   5.6 $   &   $   5.4 \pm 0.8 $   &   $   1.3 $   &   $   8.0 $   &   $   5.2 \pm 0.7 $   &   $   1.0 $   &   $   7.6 $   \\\hline
{}  $   80  $   &   $   80  $   &   $   3.3 \pm 0.5 $   &   $   0.9 $   &   $   5.3 $   &   $   4.0 \pm 0.6 $   &   $   1.0 $   &   $   6.3 $   &   $   4.9 \pm 0.8 $   &   $   1.0 $   &   $   7.5 $   &   $   5.2 \pm 0.7 $   &   $   0.7 $   &   $   7.9 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   5   $   &   $   1.3 \pm 0.4 $   &   $   -0.1    $   &   $   2.8 $   &   $   0.8 \pm 0.3 $   &   $   -0.5    $   &   $   1.9 $   &   $   0.9 \pm 0.3 $   &   $   -0.1    $   &   $   1.4 $   &   $   0.9 \pm 0.3 $   &   $   0.0 $   &   $   1.2 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   10  $   &   $   1.2 \pm 0.3 $   &   $   -0.6    $   &   $   2.7 $   &   $   1.2 \pm 0.3 $   &   $   0.0 $   &   $   2.6 $   &   $   0.8 \pm 0.3 $   &   $   -0.2    $   &   $   1.7 $   &   $   0.9 \pm 0.2 $   &   $   -0.1    $   &   $   1.3 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   20  $   &   $   1.2 \pm 0.4 $   &   $   -0.7    $   &   $   3.0 $   &   $   1.2 \pm 0.3 $   &   $   -0.4    $   &   $   2.6 $   &   $   1.7 \pm 0.4 $   &   $   0.1 $   &   $   2.4 $   &   $   2.1 \pm 0.4 $   &   $   0.1 $   &   $   3.3 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   40  $   &   $   1.1 \pm 0.3 $   &   $   -0.6    $   &   $   2.7 $   &   $   1.6 \pm 0.4 $   &   $   -0.4    $   &   $   2.8 $   &   $   2.6 \pm 0.5 $   &   $   0.3 $   &   $   3.9 $   &   $   2.6 \pm 0.5 $   &   $   0.3 $   &   $   3.9 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   80  $   &   $   0.7 \pm 0.4 $   &   $   -1.2    $   &   $   2.3 $   &   $   1.6 \pm 0.4 $   &   $   -0.4    $   &   $   3.2 $   &   $   2.2 \pm 0.5 $   &   $   -0.2    $   &   $   4.0 $   &   $   3.0 \pm 0.5 $   &   $   0.5 $   &   $   4.7 $   \\\hline
\rowcolor[gray]{.8}
{}  $   160 $   &   $   160 $   &   $   1.0 \pm 0.4 $   &   $   -0.8    $   &   $   2.5 $   &   $   1.7 \pm 0.4 $   &   $   0.0 $   &   $   3.1 $   &   $   2.6 \pm 0.5 $   &   $   0.4 $   &   $   4.0 $   &   $   3.4 \pm 0.5 $   &   $   0.6 $   &   $   5.5 $   \\\hline
\end{tabular}
}%end scriptsize
\end{minipage}
}
\end{picture}
\caption{Exploration of NMA performance versus SNN performance as
$N_D$, $N$ and $K$ are varied. The error ranges are 99\%
confidence intervals in the mean. $Q_l$ and $Q_u$ denote the lower
and upper quartiles, respectively.} \label{table:NMA_results}
\end{table}


