-2 0 2

0.36

0.38 0.4 test error

C = 1

-2 0 2

0.36

0.38 0.4 C = 4.641589e+01

-2 0 2

0.355

0.36

0.365

C = 2.154435e+03

-2 0 2

0.36

0.38

C = 100000

-2 0 2 5 6

C2

-2 0 2 4.5 5 5.5 6 6.5

-2 0 2 4.2 4.4

-2 0 2 4.4 4.6 4.8 5 5.2 5.4

-2 0 2 12 13

C3

-2 0 2 10 11 12

-2 0 2 9.6 9.8 10 10.2

10.4

10.6

10.8

-2 0 2 10 10.5 11 11.5

-2 0 2 1.3 1.4 1.5 rm

-2 0 2 2 3 4

-2 0 2 2 4 6 8 10 12

-2 0 2 20 40

-2 0 2

0.82

0.84

0.86

0.88 0.9 0.92 rrm

-2 0 2 1 1.1 1.2

-2 0 2 1 1.5

-2 0 2 1 2

-2 0 2 1 1.1 1.2 trace

-2 0 2 0.6 0.8 1 1.2

-2 0 2 0.5 1

-2 0 2 0.5 1

-5 0 5 18 20 22 sm

-5 0 5 0 20 40

-5 0 5 5 10 15

-5 0 5 5 10 15

-5 0 5 4 6 8 cs

-5 0 5 2 4 6

-5 0 5 3 4 5

-5 0 5 3 4 5

-2 0 2

0.36

0.38 0.4 span log10(sigma)

-2 0 2

0.35

0.4

log10(sigma)

-2 0 2 0.3 0.35

log10(sigma)

-2 0 2

0.25 0.3 0.35

log10(sigma) dataset flare-solar