-2 0 2

0.05 0.1 0.15 0.2 0.25 test error

C = 1

-2 0 2

0.05 0.1 0.15 0.2 0.25

C = 4.641589e+01

-2 0 2

0.05 0.1 0.15 0.2 0.25

C = 2.154435e+03

-2 0 2

0.05 0.1 0.15 0.2 0.25

C = 100000

-2 0 2 4 6 8

C2

-2 0 2 3 4 5 6 7

-2 0 2 3 4 5 6 7

-2 0 2 3 4 5 6 7

-2 0 2 5 10 15

C3

-2 0 2 4 6 8 10 12 14

-2 0 2 2 4 6 8 10 12 14

-2 0 2 2 4 6 8 10 12 14

-2 0 2 1 1.5 rm

-2 0 2 2 3 4

-2 0 2 5 10 15

-2 0 2 20 40 60

-2 0 2 0.5 1 rrm

-2 0 2 1 1.5 2

-2 0 2 2 4 6

-2 0 2 5 10 15

-2 0 2 0.5

1 trace

-2 0 2 0.4 0.6 0.8

-2 0 2 0.4 0.6 0.8

-2 0 2 0.2 0.4 0.6 0.8

-5 0 5 0 20 40 sm

-5 0 5 0 20 40

-5 0 5 0 20 40

-5 0 5 0 20 40

-5 0 5 0 5 10 cs

-5 0 5 0 5 10

-5 0 5 0 5 10

-5 0 5 0 5 10

-2 0 2 0.1 0.2 0.3 span log10(sigma)

-2 0 2 0.1 0.2 0.3

log10(sigma)

-2 0 2 0.1 0.2 0.3

log10(sigma)

-2 0 2 0.1 0.2 0.3

log10(sigma) dataset thyroid