% GNUPLOT: LaTeX picture
\setlength{\unitlength}{0.240900pt}
\ifx\plotpoint\undefined\newsavebox{\plotpoint}\fi
\sbox{\plotpoint}{\rule[-0.200pt]{0.400pt}{0.400pt}}%
\begin{picture}(1200,720)(0,0)
\font\gnuplot=cmr10 at 10pt
\gnuplot
\sbox{\plotpoint}{\rule[-0.200pt]{0.400pt}{0.400pt}}%
\put(180.0,82.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(160,82){\makebox(0,0)[r]{ 0.03}}
\put(1119.0,82.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(180.0,202.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(160,202){\makebox(0,0)[r]{ 0.035}}
\put(1119.0,202.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(180.0,321.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(160,321){\makebox(0,0)[r]{ 0.04}}
\put(1119.0,321.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(180.0,441.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(160,441){\makebox(0,0)[r]{ 0.045}}
\put(1119.0,441.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(180.0,560.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(160,560){\makebox(0,0)[r]{ 0.05}}
\put(1119.0,560.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(180.0,680.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(160,680){\makebox(0,0)[r]{ 0.055}}
\put(1119.0,680.0){\rule[-0.200pt]{4.818pt}{0.400pt}}
\put(372.0,82.0){\rule[-0.200pt]{0.400pt}{4.818pt}}
\put(372,41){\makebox(0,0){$\delta_{HT}$}}
\put(372.0,660.0){\rule[-0.200pt]{0.400pt}{4.818pt}}
\put(564.0,82.0){\rule[-0.200pt]{0.400pt}{4.818pt}}
\put(564,41){\makebox(0,0){$\delta_1$}}
\put(564.0,660.0){\rule[-0.200pt]{0.400pt}{4.818pt}}
\put(755.0,82.0){\rule[-0.200pt]{0.400pt}{4.818pt}}
\put(755,41){\makebox(0,0){$\delta_2$}}
\put(755.0,660.0){\rule[-0.200pt]{0.400pt}{4.818pt}}
\put(947.0,82.0){\rule[-0.200pt]{0.400pt}{4.818pt}}
\put(947,41){\makebox(0,0){$\delta_{PKPD}$}}
\put(947.0,660.0){\rule[-0.200pt]{0.400pt}{4.818pt}}
\put(180.0,82.0){\rule[-0.200pt]{231.023pt}{0.400pt}}
\put(1139.0,82.0){\rule[-0.200pt]{0.400pt}{144.058pt}}
\put(180.0,680.0){\rule[-0.200pt]{231.023pt}{0.400pt}}
\put(180.0,82.0){\rule[-0.200pt]{0.400pt}{144.058pt}}
\put(372,615){\usebox{\plotpoint}}
\multiput(372.00,613.92)(3.344,-0.497){55}{\rule{2.748pt}{0.120pt}}
\multiput(372.00,614.17)(186.296,-29.000){2}{\rule{1.374pt}{0.400pt}}
\multiput(564.00,584.92)(6.517,-0.494){27}{\rule{5.193pt}{0.119pt}}
\multiput(564.00,585.17)(180.221,-15.000){2}{\rule{2.597pt}{0.400pt}}
\multiput(755.00,571.58)(3.344,0.497){55}{\rule{2.748pt}{0.120pt}}
\multiput(755.00,570.17)(186.296,29.000){2}{\rule{1.374pt}{0.400pt}}
\put(372,615){\raisebox{-.8pt}{\makebox(0,0){$\Diamond$}}}
\put(564,586){\raisebox{-.8pt}{\makebox(0,0){$\Diamond$}}}
\put(755,571){\raisebox{-.8pt}{\makebox(0,0){$\Diamond$}}}
\put(947,600){\raisebox{-.8pt}{\makebox(0,0){$\Diamond$}}}
\sbox{\plotpoint}{\rule[-0.500pt]{1.000pt}{1.000pt}}%
\put(372,115){\usebox{\plotpoint}}
\multiput(372,115)(20.754,0.216){10}{\usebox{\plotpoint}}
\multiput(564,117)(20.708,1.409){9}{\usebox{\plotpoint}}
\multiput(755,130)(20.751,0.432){9}{\usebox{\plotpoint}}
\put(947,134){\usebox{\plotpoint}}
\put(372,115){\makebox(0,0){$+$}}
\put(564,117){\makebox(0,0){$+$}}
\put(755,130){\makebox(0,0){$+$}}
\put(947,134){\makebox(0,0){$+$}}
\end{picture}
